Rietveld’s Red and Blue Chair 1918

• Dowel, glue, 8 round head screws,

16 flat head wood screws, 4 slanted L braces

• Glossy enamel paint:

primary red, blue, yellow, and black lacquer wood stain

• Oak wood • Listels are 2.5 cm by 2.6 cm

Scale: 10 cm

1 cm = 10 cm actual

Table (modified) 1920

• Dowel, glue • Glossy enamel paint:

primary red, blue, yellow, and black lacquer wood stain

• Oak wood • Listels are 2.5 cm by 2.6 cm

Scale: 10 cm

1 cm = 10 cm actual

Telephone Table 1989

• Dowel, glue • Glossy enamel paint:

primary red, blue, yellow, and black lacquer wood stain

• Oak wood • Listels are 2.5 cm by 2.6 cm

Scale: 10 cm

1 cm = 10 cm actual

70 cm

3 cm

1.2 cm thick

40 cm

35 cm

Rietveld’s Hanging Lamp 1920

• Three Legrand 220-230 volt 60 watt or

Phillips vitrine 37 x 310 cm opaal S19 220-230 volt 60 watt strip light bulbs IR£2.75 (1991) and Fl. 13.65 (1990)

• Seven glass tubes 9 mm exterior and

7 mm interior diameter, varying lengths: 1. 68 cm (1) 2. 58.5 cm (2) 3. 46.8 cm (2) 4. 35 cm (1) 5. 2 cm (1)

• 600 cm or about 20 feet 16 gage 100%

copper core stranded primary white flex

• Six #6 stud size rings for flex, rated for

22-18 gage on package, but 22-16 on ring itself, red base (stripped off)

• Three #6 pan phillips head 5/8 inch

tapping screws steel finish

• Six compression springs: 3 inch 13/32

free length, 0.058 inch wire diameter spring steel, 12 1/2 coils, 0.725 solid height, 3.01 calculated rate lbs/inch, cl/grd ends, gold/irridite cad plate finish QQ-P-416 Type 2 Class 2 L.A. Century Spring Company #2593

• Six 3 cm x 3 cm x 4 cm oak wood

blocks with 7/8 inch hole in one end

• One 40 cm x 40 cm x 1.2 cm oak

plywood ceiling plate

• Two plastic connectors • 15 feet white stranded 100% copper

double lamp flex

• One polarized white plug • 120 milliliters or 4 oz. matt black paint

Scale: 10 cm

1 cm = 10 cm actual

4 cm

Zigzag Chair 1934

• Dovetail, dowel, glue, screws • Untreated finish • Elm wood

Scale: 10 cm

1 cm = 10 cm actual

61.5 cm

98°

43 cm

45°

39 cm 32.4 cm

29.6 cm

14.5 cm

2 cm thick

32.4 cm

40.5 cm

3 cm by 3.66 cm

33.5 cm

37 cm

0.5 cm 2 cm

2 cm

7.2 cm

6 cm

Chrome–plateor Stainless Steel

Table Lamp 1925

• 60 watt, 8 cm diameter

silver-treated light bulb

• Beechwood plug and wedges • Socket plug • Stainless steel and brass

pipes

• 1.5 mm square black and

blue flex

Scale: 5 cm

1 cm = 5 cm actual

a.

b.

c.

d.

e.

e.

f.

Ultramarine(blue)Matt

Vermillion (red)

Black Matt

Black Matt

a. ∅ 3.8 cm x 6.5 cm lamp holder ∅ 1 1/2” x 2 9/16”

b. ∅ 0.8 cm x 38.0 cm standard ∅ 5/16” x 15”

c. ∅ 3.0 cm x 12.0 cm big foot ∅ 1 3/16” x 4 3/4”

d. ∅ 0.3 cm x 15 cm little foot ∅ 1/8” x 5 7/8”

e. ∅ 0.8 cm x 0.8 cm connectors ∅ 5/16” x 5/16”

f. ∅ 3.6 cm x 0.3 cm beechwood ∅ 1 1/2” x 1/8” plug

38 cm

1.5 cm

33.8 cm

2.7 cm

7.5 cm

7.5 cm 3.4 cm

8.6 cm

4.5 cm

2 cm